0 5000 10000 15000 -80 -60 -40 -20

f (Hz) power (dB)

0 5000 10000 15000 -80 -60 -40 -20 0

f (Hz) with bell

0 5000 10000 15000 -80 -60 -40 -20 0

f (Hz) no bell